/******************************************************************************

	image size    : 8 x 8 x 4 'arrow_d.inta' 

	char size     : 8 x 8

	number of char: 1 (1 x 1)

	format        : IA8

******************************************************************************/



static Gfx texArrowD_C_dummy_aligner1[] = { gsSPEndDisplayList() };



unsigned char texArrowD[] = {

	/*  0 (00h) */

	0x01, 0x01, 0x01, 0x01, 0x01, 0x01, 0x01, 0x01, 

	0xfc, 0xfc, 0xfc, 0xfc, 0xfc, 0xfc, 0xfc, 0xfc, 

	0xfc, 0xff, 0xff, 0xff, 0xff, 0xff, 0xff, 0xfc, 

	0xf6, 0xfc, 0xff, 0xff, 0xff, 0xff, 0xfc, 0xf6, 

	0xf1, 0xf6, 0xfc, 0xff, 0xff, 0xfc, 0xf6, 0xf1, 

	0x00, 0xf1, 0xf6, 0xfc, 0xfc, 0xf6, 0xf1, 0x00, 

	0x00, 0x00, 0xf1, 0xf6, 0xf6, 0xf1, 0x00, 0x00, 

	0x00, 0x00, 0x00, 0xf1, 0xf1, 0x00, 0x00, 0x00, 

};

